BASICS:
To change any MASK settings, click the CHECK BOX next to
a field name. The MASKING is ON if the field name is Grey
and the box has an 'x'.

RESULT:
The marked fields will not be printed if the menu item
"Mask Condition" is ON.

NOTES:
There is no keyboard equivalent for toggling the MASK
settings.
